Quintiq file version 2.0
#root
#parent: LibOpt_Desktop
OrphanComponent LibOpt_DialogScopeElements
{
  #keys: '[139544.0.603002221]'
  BaseType: 'Dialog'
  Databinding: 'LibOpt_Run'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 807 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListLibOpt_ScopeElement
        Position { startcolumn: 807 startrow: 915 endcolumn: 807 endrow: 915 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 915 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar413
    #child: ListLibOpt_ScopeElement
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 284
    Title: 'Select scope elements'
    Width: 380
    ModeledStringList ChildOrdering
    {
      c: Toolbar413
      c: ListLibOpt_ScopeElement
    }
  ]
}
