Quintiq file version 2.0
#root
#parent: LibOpt_Desktop
OrphanComponent LibOpt_FormBreakpoint
{
  #keys: '[139164.0.308036247]'
  BaseType => /LibOpt_FormBase
  Databinding: 'structured[LibOpt_BreakpointConditional]*'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 435 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListBreakpointConditional
        Position { startcolumn: 435 startrow: 936 endcolumn: 435 endrow: 936 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 936 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListBreakpointConditional
    Component DataHolderPanel
    {
      #keys: '[139164.0.361142128]'
      BaseType => /LibOpt_FormBase/DataHolderPanel
      IsDerived: true
      Properties:
      [
        PosX: 53
        PosY: 3
      ]
    }
  ]
  Properties:
  [
    Height: 336
    Image: 'BREAKPOINTS'
    IncludeInView: true
    Title: 'Breakpoints'
    Width: 550
    ModeledStringList ChildOrdering
    {
      c: DataHolderPanel
      c: ListBreakpointConditional
    }
  ]
}
