Quintiq file version 2.0
#root
#parent: LibOpt_Desktop
OrphanComponent LibOpt_FormIteration
{
  #keys: '[139164.5.1067699964]'
  BaseType => /LibOpt_FormBase
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 354 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListIteration
        Position { startcolumn: 354 startrow: 986 endcolumn: 354 endrow: 986 }
      }
      GBElement
      {
        Component => ButtonToggle
        Position { startcolumn: 354 startrow: 268 endcolumn: 354 endrow: 268 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 268 parent: 0 }
      GBFlow.Row { grow: 128 id: 986 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListIteration
    Component ButtonToggle
    {
      #keys: '[139544.3.46621779]'
      BaseType: 'Button'
      Properties:
      [
        Tooltip: 'By default the iterations are not created, to minimize performance impact of your optimizer. Click the button above to enable iterations.'
      ]
    }
  ]
  Properties:
  [
    Height: 406
    Image: 'LIST_STYLE_NUMBERED'
    Title: 'Iterations'
    Width: 559
    ModeledStringList ChildOrdering
    {
      c: DataHolderPanel
      c: ListIteration
      c: ButtonToggle
    }
  ]
}
