Quintiq file version 2.0
#parent: ListKpiQuery/tmrAutoSelectSnapshots
Response OnTimer () id:Response_ListKpiQuery_tmrAutoSelectSnapshots_OnTimer
{
  #keys: '[146874.0.1480437387]'
  Body:
  [*
    // Unset the timer again, and select all Snapshots (if the checkbox is checked)
    this.Enabled( false );
    Form.AutoSelectSnapshots();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUITimer_OnTimer'
}
