Quintiq file version 2.0
#parent: ListTG_UIField/DataHolderTabPages
Response OnDataChanged () id:Response_ListTG_UIField_DataHolderTabPages_OnDataChanged
{
  #keys: '[142876.10.197244920]'
  Body:
  [*
    isactive := this.Data().Size() = 0;
    
    DataHolderFinal.SetDataExtractorState( GUIDataExtractorDialog, isactive );
    DataHolderFinal.SetDataExtractorState( GUIDataExtractorTabPage, not isactive );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnDataChanged'
}
