Quintiq file version 2.0
#parent: CustomDrawComponentContainer
Response OnClick () id:Response_CustomDrawComponentContainer_MenuAutoFit_OnClick
{
  #keys: '[139164.4.944257718]'
  Body:
  [*
    MenuAutoFit.Checked( not MenuAutoFit.Checked() );
    Form.Resize();
  *]
  CanBindMultiple: false
  DefinitionID => /CustomDrawComponentContainer/Responsedef_CustomDrawComponentContainer_Menu_OnClick
  Initiator: 'MenuAutoFit'
}
