Quintiq file version 2.0
#parent: CustomDrawComponentContainer/ResizeTimer
Response OnTimer () id:Response_CustomDrawComponentContainer_ResizeTimer_OnTimer
{
  #keys: '[139164.4.931020480]'
  Body:
  [*
    // Resize when the width of the component is bigger.
    
    if( CustomDrawComponentContainer.Width() <> 0 )
    {
      Form.Resize();
      this.Enabled( false );
    }
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUITimer_OnTimer'
}
