Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogShowTripFeedback
{
  #keys: '[113694.1.488345003]'
  Accessibility: 'Extensible'
  BaseType: 'Dialog'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 9 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListFeedback
        Position { startcolumn: 9 startrow: 9 endcolumn: 9 endrow: 9 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 9 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar
    #child: ListFeedback
  ]
  Properties:
  [
    Height: 303
    Image: 'FOLDER_INFORMATION'
    IncludeInView: true
    InitialPlacement: 'floating'
    Title: 'Trip feedback'
    Width: 750
    ModeledStringList ChildOrdering
    {
      c: Toolbar
      c: ListFeedback
    }
  ]
}
