Quintiq file version 2.0
#parent: btnPTFStatus
Response OnClick () id:Response_LibPTF_pnlTestRunner_btnPTFStatus_OnClick
{
  #keys: '[2436.0.7645223]'
  Body:
  [*
    // Launch the LibPTF_FormPTFStatus form
    openfrm := select( Application.Frame(), SubComponents.astype( LibPTF_frmPTFStatus ), f, true );
    if( isnull( openfrm ) )
    {
      frm := construct( LibPTF_frmPTFStatus );
      Application.Frame().ShowForm( &frm );
    }
    else
    {
      openfrm.SetFocus();
    }
  *]
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
}
