Quintiq file version 2.0
#parent: pnlStartAndEnd/datEndDate
Response OnChanged () id:Response_pnlStartAndEnd_datEndDate_OnChanged
{
  #keys: '[146730.0.901525189]'
  Body:
  [*
    // Update the 'memory', but only when not all day, because otherwise the duration will keep increasing.
    // Exception: if the ValueHolder has not been initialized yet it should be done now.
    if( not ckbIsAllDay.Checked() or
        vhEndDate.Data().IsInfinite() )
    {
      vhEndDate.Data( this.Date() );
    }
    
    Dialog.UpdateDuration();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIDateSelector_OnChanged'
}
