Quintiq file version 2.0
Component GroupPanelCapacitySmoothing
{
  #keys: '[110880.8.191453773]'
  BaseType: 'GroupPanel'
  ViewSecurity: 'CapacitySmoothing'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 5 parent: 0 }
      GBFlow.Column { grow: 128 id: 674 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => CheckBoxHasCapacitySmoothing
        Position { startcolumn: 5 startrow: 1 endcolumn: 674 endrow: 1 }
      }
      GBElement
      {
        Component => RadioButtonGroupIsSmoothCapacityOverAllPeriods
        Position { startcolumn: 674 startrow: 3 endcolumn: 674 endrow: 19 }
      }
      GBElement
      {
        Component => LabelSmoothOver
        Position { startcolumn: 5 startrow: 3 endcolumn: 5 endrow: 3 }
      }
      GBElement
      {
        Component => /EditorCapacitySmoothingLength
        Position { startcolumn: 674 startrow: 6 endcolumn: 674 endrow: 6 }
      }
      GBElement
      {
        Component => CheckBoxIsOverlapCapacitySmoothing
        Position { startcolumn: 674 startrow: 7 endcolumn: 674 endrow: 7 }
      }
      GBElement
      {
        Component => /EditorCapacitySmoothingPercentageDelta
        Position { startcolumn: 674 startrow: 10 endcolumn: 674 endrow: 10 }
      }
      GBElement
      {
        Component => LabelCapacitySmoothingPercentageDelta
        Position { startcolumn: 5 startrow: 10 endcolumn: 5 endrow: 10 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 0 }
      GBFlow.Row { grow: 0 id: 10 parent: 0 }
      GBFlow.Row { grow: 0 id: 3 parent: 0 }
      GBFlow.Row { grow: 0 id: 19 parent: 0 }
      GBFlow.Row { grow: 0 id: 6 parent: 0 }
      GBFlow.Row { grow: 0 id: 7 parent: 0 }
    ]
  }
  Children:
  [
    Component CheckBoxHasCapacitySmoothing
    {
      #keys: '[110880.8.191453777]'
      BaseType: 'CheckBox'
      ViewSecurity: 'CapacitySmoothing'
      Properties:
      [
        DataBinding: 'Dialog.Data.HasCapacitySmoothing'
        Shortcut: 'Alt+S'
        Text: 'Use capacity &smoothing'
        Tooltip: 'When checked, changes in capacity usage for subsequent periods will not exceed the Delta value'
      ]
    }
    Component RadioButtonGroupIsSmoothCapacityOverAllPeriods
    {
      #keys: '[110880.8.191453780]'
      BaseType: 'RadioButtonGroup'
      ViewSecurity: 'CapacitySmoothing'
      Properties:
      [
        BoundValue: 'true'
        ButtonLabels: '&Entire planning horizon;&Fixed number of periods:'
        ButtonValues: 'true;false'
        DataBinding: 'Dialog.Data.IsSmoothCapacityOverAllPeriods'
      ]
    }
    Component LabelSmoothOver
    {
      #keys: '[110880.8.191453776]'
      BaseType: 'Label'
      ViewSecurity: 'CapacitySmoothing'
      Properties:
      [
        Alignment: 'right'
        Text: 'Smooth over'
        Transparent: true
      ]
    }
    #child: EditorCapacitySmoothingLength
    Component CheckBoxIsOverlapCapacitySmoothing
    {
      #keys: '[110880.8.191453783]'
      BaseType: 'CheckBox'
      ViewSecurity: 'CapacitySmoothing'
      Properties:
      [
        DataBinding: 'Dialog.Data.IsOverlapCapacitySmoothing'
        Shortcut: 'Alt+V'
        Text: 'O&verlapped smoothing'
      ]
    }
    #child: EditorCapacitySmoothingPercentageDelta
    Component LabelCapacitySmoothingPercentageDelta
    {
      #keys: '[110880.8.191453775]'
      BaseType: 'Label'
      ViewSecurity: 'CapacitySmoothing'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorCapacitySmoothingPercentageDelta'
        Shortcut: 'Alt+D'
        Text: '&Delta (%)'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    DataBinding: 'Dialog.Data.Unit.IsAlwaysAtMaximumCapacity'
    Text: 'Capacity smoothing'
    ModeledStringList ChildOrdering
    {
      c: CheckBoxHasCapacitySmoothing
      c: EditorCapacitySmoothingPercentageDelta
      c: RadioButtonGroupIsSmoothCapacityOverAllPeriods
      c: EditorCapacitySmoothingLength
      c: CheckBoxIsOverlapCapacitySmoothing
      c: LabelSmoothOver
      c: LabelCapacitySmoothingPercentageDelta
    }
  ]
}
