Quintiq file version 2.0
Component dpPeriod
{
  #keys: '[131094.1.101613852]'
  BaseType: 'DetailPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 166 parent: 0 }
      GBFlow.Column { grow: 0 id: 365 parent: 0 }
      GBFlow.Column { grow: 0 id: 278 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => lblStartOfPeriod
        Position { startcolumn: 166 startrow: 461 endcolumn: 166 endrow: 461 }
      }
      GBElement
      {
        Component => ckbEndOfPeriod
        Position { startcolumn: 166 startrow: 821 endcolumn: 166 endrow: 821 }
      }
      GBElement
      {
        Component => durStartTimeOfDay
        Position { startcolumn: 278 startrow: 461 endcolumn: 278 endrow: 461 }
      }
      GBElement
      {
        Component => durEndTimeOfDay
        Position { startcolumn: 278 startrow: 821 endcolumn: 278 endrow: 821 }
      }
      GBElement
      {
        Component => datStartOfPeriod
        Position { startcolumn: 365 startrow: 461 endcolumn: 365 endrow: 461 }
      }
      GBElement
      {
        Component => datEndOfPeriod
        Position { startcolumn: 365 startrow: 821 endcolumn: 365 endrow: 821 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 461 parent: 0 }
      GBFlow.Row { grow: 0 id: 821 parent: 0 }
    ]
  }
  Children:
  [
    Component lblStartOfPeriod
    {
      #keys: '[131094.1.101613853]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        Text: 'Start'
        Transparent: true
      ]
    }
    Component vhStartOfPeriod
    {
      #keys: '[131094.1.101613854]'
      BaseType: 'ValueHolder'
      Databinding: 'Date'
      Properties:
      [
        PosX: 243
        PosY: 1
      ]
    }
    Component ckbEndOfPeriod
    {
      #keys: '[131094.1.101613857]'
      BaseType: 'CheckBox'
      Properties:
      [
        Text: 'End'
      ]
    }
    Component durStartTimeOfDay
    {
      #keys: '[131094.1.120466523]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        Format: 'h:m'
        Granularity: '15_minutes'
        MaxDuration: '23:59:00'
        MinDuration: '0:00:00'
      ]
    }
    Component durEndTimeOfDay
    {
      #keys: '[131094.1.120467002]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        Format: 'h:m'
        Granularity: '15_minutes'
        MaxDuration: '23:59:00'
        MinDuration: '0:00:00'
      ]
    }
    Component datStartOfPeriod
    {
      #keys: '[146730.0.901524277]'
      BaseType: 'GUIDateSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        Date: 2020-11-07
        Format: 'DMMY'
      ]
    }
    Component datEndOfPeriod
    {
      #keys: '[146730.0.901524482]'
      BaseType: 'GUIDateSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        Date: 2020-11-07
        Format: 'DMMY'
      ]
    }
  ]
  Properties:
  [
    ModeledStringList ChildOrdering
    {
      c: lblStartOfPeriod
      c: datStartOfPeriod
      c: durStartTimeOfDay
      c: ckbEndOfPeriod
      c: datEndOfPeriod
      c: durEndTimeOfDay
      c: vhStartOfPeriod
    }
  ]
}
