Quintiq file version 2.0
#root
#parent: DataIntegrationFramework
OrphanComponent LibDIF_pnlButtonImportFromXLS
{
  #keys: '[146730.0.583903707]'
  BaseType: 'Panel'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 307 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => btnImportFromXLS
        Position { startcolumn: 307 startrow: 454 endcolumn: 307 endrow: 454 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 454 parent: 0 }
    ]
  }
  Children:
  [
    Component btnImportFromXLS
    {
      #keys: '[146730.0.583903722]'
      BaseType: 'Button'
      Properties:
      [
        Image: 'THICK_ARROW_DOWN_GREEN'
        Tooltip: 'Import data from Excel and synchronize'
      ]
    }
  ]
}
