Quintiq file version 2.0
Component PanelInputLotSizeBatch
{
  #keys: '[135040.0.267994521]'
  BaseType: 'WebPanel'
  Children:
  [
    Component EditFieldInputLotSizeUOM
    {
      #keys: '[135040.0.268001514]'
      BaseType: 'WebEditField'
      Properties:
      [
        FixedSize: false
        Label: 'Input lot size (UOM)'
        Mask: 'REAL'
        MaxRows: 0
        Taborder: 1
        Tooltip: 'An input lot size of 100 means that any inputs of operation using this product in stocking point will have to be a multiple of 100. By default 0 means disabled.'
        WordWrap: false
      ]
    }
    Component CheckboxBatchLotSize
    {
      #keys: '[135040.0.268001569]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        Taborder: 0
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 5
  ]
}
