Quintiq file version 2.0
#parent: pHeader_136/bDetectingNegativeValues_791
Response OnClick () id:Response_pHeader_bDetectingNegativeValues_OnClick_812
{
  #keys: '[730572.0.159950552]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebButton_OnClick'
  QuillAction
  {
    Body:
    [*
      res := NewAssemblyOnlinePlanCell::DetectingNegativeValues( MacroPlan );
      
      WebMessageBox::Success( res, true );
    *]
    GroupServerCalls: false
  }
}
