Quintiq file version 2.0
#parent: rbgKpiInterpretation
Response OnUserChange () id:Response_Kpi_dlgKpiMetaData_rbgKpiInterpretation_OnUserChange
{
  #keys: '[136398.1.497514058]'
  Body:
  [*
    //  Update the IsMaximize/IsMinimize attributes with the setting of the radiobuttons.
    Dialog.UpdateInterpretationData();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_RadioButtonGroup_OnUserChange'
}
