Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent FormCapacityPlanning
{
  #keys: '[112884.1.898653109]'
  Accessibility: 'Extensible'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 4 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => GanttChartUnitCalendar
        Position { startcolumn: 4 startrow: 7 endcolumn: 4 endrow: 7 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 7 parent: 0 }
    ]
  }
  Children:
  [
    #child: GanttChartUnitCalendar
  ]
  Properties:
  [
    Height: 448
    Image: 'AVERAGE'
    IncludeInView: true
    InitialPlacement: 'workspace'
    Title: 'Capacity planning'
    Width: 899
  ]
}
