Quintiq file version 2.0
#root
#parent: LibOpt_BTDesktop
OrphanComponent FormTargetKPI
{
  #keys: '[139544.1.1282085957]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 351 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListLibOpt_BT_TargetKPI
        Position { startcolumn: 351 startrow: 164 endcolumn: 351 endrow: 164 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 164 parent: 0 }
    ]
  }
  Children:
  [
    Component DataHolderCell
    {
      #keys: '[139544.1.1282087389]'
      BaseType: 'DataHolder'
      Databinding: 'LibOpt_BT_TrackingTableCell'
      Children:
      [
        Component GUIDataExtractor310
        {
          #keys: '[139544.1.1282087390]'
          BaseType: 'GUIDataExtractor'
          Properties:
          [
            Component: 'FormCellsMatrix.MatrixEditor'
            DataType: 'LibOpt_BT_TrackingTableCell'
            PosX: 24
            PosY: 45
          ]
        }
      ]
      Properties:
      [
        PosX: 57
        PosY: 40
      ]
    }
    #child: ListLibOpt_BT_TargetKPI
  ]
  Properties:
  [
    Height: 263
    IncludeInView: true
    Title: 'Target KPIs'
    Width: 405
    ModeledStringList ChildOrdering
    {
      c: DataHolderCell
      c: ListLibOpt_BT_TargetKPI
    }
  ]
}
