Quintiq file version 2.0
#parent: #root
Method PTF_StopTestExecution () id:Method_LibPTF_pnlTestController_PTF_StopTestExecution
{
  #keys: '[103546.0.102755101]'
  Body:
  [*
    // Halt an ongoing PTF execution
    message   := "The test is currently running." + String::NewLine() + String::NewLine()
                 + "Do you want to break off the current execution?";
    
    if( MessageBox::Warning( this, message, '&Yes|&No', 1 ) = 0 )
    {
      LibPTF_pnlTestController.gt().Enabled( false );
      lstExecutionTestScript.Strings( "" );
    
      lblEndTime.Text( "N/A" );
      lblStartTime.Text( "N/A" );
      lblDurationTime.Text( "N/A" );
    
      // Clean up of all temporary files
      traverse( dhSelectedScripts.Data(), Elements, s )
      {
        OS::RemoveFile( LibPTF_pnlTestController.PTF_GetScriptPath() + s.User() + "_" + s.Project() + LibPTF::FileExtRunningScript() );
      }
    
      OS::RemoveFile( LibPTF_pnlTestController.PTF_GetBatchFileFullPathForKickStartClient() );
      OS::RemoveFile( LibPTF_pnlTestController.PTF_GetBatchFileFullPathForStartClient() );
    
      if( this.chkExecutePythonScripts().Checked() )
      {
        // Remove batch file if stop execution
        OS::RemoveFile( LibPTF_pnlTestController.PTF_GetBatchFileFullPathForMergeResult() );
        // Remove batch file if stop execution
        OS::RemoveFile( LibPTF_pnlTestController.PTF_GetBatchFileFullPathForExecutePythonScript() );
      }
    
      if( this.PTF_IsCopyQTransLogs() )
      {
        OS::RemoveFile( LibPTF_pnlTestController.PTF_GetBatchFileFullPathForCollectQServerLog() );
      }
    }
  *]
}
