Quintiq file version 2.0
#parent: gpSeriesSelection/cbOnlyLastSnapshot
Response OnUserChange () id:Response_gpSeriesSelection_cbOnlyLastSnapshot_OnUserChange
{
  #keys: '[146450.0.1358703349]'
  Body:
  [*
    // Refresh the KPI-filter
    Form.RefreshUIIsLastAttribute();
    Form.FilterDataOnSelectedKpis();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnUserChange'
}
