Quintiq file version 2.0
#parent: #root
Method ClickBtnOk () id:Method_DialogOrganCode_ClickBtnOk
{
  #keys: '[412960.0.279955432]'
  Body:
  [*
    // Disabled button to prevent the possibility of multiple firing
    
    btnOk.Enabled(false,'');
    
    // OnOk
    this.ApplyChanges();
    
    DataHolderOrganCode.Data().Commit();
    
    this.Close();
  *]
}
