Quintiq file version 2.0
#root
#parent: KpiTrackerDesktop
OrphanComponent Kpi_dlgSettings
{
  #keys: '[146874.1.127048683]'
  Accessibility: 'Extensible'
  BaseType: 'Dialog'
  Databinding: 'shadow[KpiGlobalParameter]'
  EditSecurity: 'Kpi_EditSettings'
  ViewSecurity: 'Kpi_EditSettings'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 812 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => tcSettings
        Position { startcolumn: 812 startrow: 172 endcolumn: 812 endrow: 172 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 172 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar252
    Component tcSettings
    {
      #keys: '[146874.1.127048919]'
      BaseType: 'TabComponent'
      Children:
      [
        #child: tpgGeneral
        #child: tpgDaemon
      ]
      Properties:
      [
        DoubleBuffering: false
        ModeledStringList ChildOrdering
        {
          c: tpgGeneral
          c: tpgDaemon
        }
      ]
    }
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 579
    Title: 'Kpi tracker settings'
    Width: 766
    ModeledStringList ChildOrdering
    {
      c: Toolbar252
      c: tcSettings
    }
  ]
}
