Quintiq file version 2.0
Component gpRecord
{
  #keys: '[146874.1.134058990]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 922 parent: 0 }
      GBFlow.Column { grow: 0 id: 577 parent: 0 }
      GBFlow.Column { grow: 0 id: 113 parent: 0 }
      GBFlow.Column { grow: 128 id: 676 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => lblRecordFrequency
        Position { startcolumn: 922 startrow: 518 endcolumn: 922 endrow: 518 }
      }
      GBElement
      {
        Component => cbRecordEnabled
        Position { startcolumn: 577 startrow: 437 endcolumn: 676 endrow: 437 }
      }
      GBElement
      {
        Component => lblRecordStartTime
        Position { startcolumn: 922 startrow: 327 endcolumn: 922 endrow: 327 }
      }
      GBElement
      {
        Component => dtRecordStartTime
        Position { startcolumn: 577 startrow: 327 endcolumn: 676 endrow: 327 }
      }
      GBElement
      {
        Component => dsRecordFrequency
        Position { startcolumn: 577 startrow: 518 endcolumn: 577 endrow: 518 }
      }
      GBElement
      {
        Component => imgWarning
        Position { startcolumn: 113 startrow: 518 endcolumn: 113 endrow: 518 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 437 parent: 0 }
      GBFlow.Row { grow: 0 id: 518 parent: 0 }
      GBFlow.Row { grow: 0 id: 327 parent: 0 }
    ]
  }
  Children:
  [
    Component lblRecordFrequency
    {
      #keys: '[146874.1.134059136]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        Text: 'Frequency'
        Transparent: true
      ]
    }
    Component cbRecordEnabled
    {
      #keys: '[146874.1.134059147]'
      BaseType: 'CheckBox'
      Properties:
      [
        DataBinding: 'Dialog.Data.RecordEnabled'
        Text: 'Enable'
      ]
    }
    Component lblRecordStartTime
    {
      #keys: '[146874.1.134059204]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        Text: 'Start time'
        Transparent: true
      ]
    }
    Component dtRecordStartTime
    {
      #keys: '[146874.1.134059237]'
      BaseType: 'GUIDateTimeSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        DataBinding: 'Dialog.Data.RecordStartTime'
      ]
    }
    Component dsRecordFrequency
    {
      #keys: '[146874.1.134059248]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        DataBinding: 'Dialog.Data.RecordFrequency'
      ]
    }
    Component imgWarning
    {
      #keys: '[146874.1.1306898904]'
      BaseType: 'Image'
      Properties:
      [
        Image: 'WARNING'
        Tooltip: 'Changes detected, click on Apply button to apply changes.'
        Transparent: true
      ]
    }
    Component vhRecordFrequency
    {
      #keys: '[156716.0.1423421685]'
      BaseType: 'ValueHolder'
      Databinding: 'Duration'
      Properties:
      [
        DataBinding: 'KpiTracker.GlobalParameter.RecordFrequency'
        PosX: 242
        PosY: 43
        ShowName: true
      ]
    }
  ]
  Properties:
  [
    Text: 'Record daemon'
    ModeledStringList ChildOrdering
    {
      c: lblRecordFrequency
      c: cbRecordEnabled
      c: dsRecordFrequency
      c: dtRecordStartTime
      c: lblRecordStartTime
      c: imgWarning
      c: vhRecordFrequency
    }
  ]
}
