Quintiq file version 2.0
#root
#parent: LibOpt_TestDesktop
OrphanComponent frmStandardAnalysis1
{
  #keys: '[104128.0.184066673]'
  BaseType: 'frmStandardAnalysis'
  Databinding: 'LibOpt_TestDataset'
  Children:
  [
    #child: swTopMost
  ]
  Properties:
  [
    Height: 396
    Image: 'HORIZONTALBARCHART'
    Width: 533
  ]
}
