Quintiq file version 2.0
#root
#parent: LibOpt_BTDesktop
OrphanComponent FormColumns
{
  #keys: '[138586.1.500763265]'
  BaseType => /FormTrackingTableBase
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 790 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListLibOpt_BT_TrackingTableColumn
        Position { startcolumn: 790 startrow: 950 endcolumn: 790 endrow: 950 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 950 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListLibOpt_BT_TrackingTableColumn
  ]
  Properties:
  [
    Height: 358
    Image: 'COLUMN'
    IncludeInView: true
    Title: 'Columns'
    Width: 442
  ]
}
