Quintiq file version 2.0
#parent: pnlNotRecurring/ckbIsAllDay
Response OnChange () id:Response_pnlNotRecurring_ckbIsAllDay_OnChange
{
  #keys: '[131094.0.1582336744]'
  Body:
  [*
    // Keep ckbAllDayRecurring on the other panel in sync, so that switching between (not) recurring goes smoothly.
    ckbIsAllDayRecurring.Checked( this.Checked() );
    Dialog.ShowAllDay();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnChange'
}
