Quintiq file version 2.0
#parent: #root
Method UpdateInterpretationControl () id:Method_DialogKpiMetaData_UpdateInterpretationControl
{
  #keys: '[136398.1.659163792]'
  Body:
  [*
    // Updates the 'Interpretation' radiobutton group to reflect the value of the selected KpiMetaData object.
    
    this.RadioButtonGroupInterpretation().BoundValue( 'counter' );
    data := this.DataHolderKpiMetaData().Data();
    
    if ( not isnull( data ) and data.IsMaximize() )
    {
      this.RadioButtonGroupInterpretation().BoundValue( 'maximize' );
    }
    else if ( not isnull( data ) and data.IsMinimize() )
    {
      this.RadioButtonGroupInterpretation().BoundValue( 'minimize' );
    }
  *]
}
