Quintiq file version 2.0
#parent: GUITimer
Response OnTimer () id:Response_SWF_CustomDrawComponentProcessDashboard_GUITimer_OnTimer
{
  #keys: '[107588.2015.1189815702]'
  Body:
  [*
    // Workaround preventing the workflow toolbar to initially show after UI start while workflow is disabled
    if ( guard( not SWF_WorkflowDataset.IsWorkflowEnabled(), true )  ) 
    {
      SWF_CustomDrawComponentProcessDashboard.ShowHideWorkflowDashboard( false );
    }
    
    // Disable the timer since it should only fire once at UI start-up
    this.Enabled( false )
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUITimer_OnTimer'
}
