Quintiq file version 2.0
#root
#parent: Calendars
OrphanComponent LibCal_dlgEditTimeInterval
{
  #keys: '[131094.0.1401958591]'
  BaseType: 'Dialog'
  Databinding: 'shadow[ExplicitTimeInterval]'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 121 parent: 0 }
      GBFlow.Column { grow: 128 id: 449 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => pnlEventInfo
        Position { startcolumn: 121 startrow: 962 endcolumn: 449 endrow: 962 }
      }
      GBElement
      {
        Component => pnlTimezone
        Position { startcolumn: 449 startrow: 171 endcolumn: 449 endrow: 171 }
      }
      GBElement
      {
        Component => lblMarginLeft
        Position { startcolumn: 121 startrow: 171 endcolumn: 121 endrow: 536 }
      }
      GBElement
      {
        Component => pnlStartAndEnd
        Position { startcolumn: 449 startrow: 536 endcolumn: 449 endrow: 536 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 962 parent: 0 }
      GBFlow.Row { grow: 0 id: 171 parent: 0 }
      GBFlow.Row { grow: 128 id: 536 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar935
    #child: pnlEventInfo
    #child: pnlTimezone
    Component lblMarginLeft
    {
      #keys: '[146730.0.1177382070]'
      BaseType: 'Label'
      Properties:
      [
        NumberColumns: 1
        Text: ''
        Transparent: true
      ]
    }
    #child: pnlStartAndEnd
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 315
    Image: 'CLOCK'
    Title: 'Edit time interval'
    Width: 466
    ModeledStringList ChildOrdering
    {
      c: pnlEventInfo
      c: pnlTimezone
      c: pnlStartAndEnd
      c: lblMarginLeft
      c: Toolbar935
    }
  ]
}
