Quintiq file version 2.0
#parent: #root
Method PTF_GUITimerPause () id:Method_LibPTF_pnlTestRunner_PTF_GUITimerPause
{
  #keys: '[105690.0.894012569]'
  Body:
  [*
    // Pause the GUITimer
    if( vhPTFExecutionStatus.Value() = LibPTF::ExecStatusRunning() )
    {
      gtPTF.Enabled( false );
      this.PTF_SetCurrentExecutionStatus( LibPTF::ExecStatusWaiting() );
    }
  *]
}
