Quintiq file version 2.0
#parent: vhSharedRepositoryExist
Response OnCreated () id:Response_LibPTF_pnlTestController_vhSharedRepositoryExist_OnCreated
{
  #keys: '[104342.0.784955270]'
  Body:
  [*
    // Stores the value whether the shared repository has the correct directories.
    // It only get populated once during the creation of PanelTestController.
    // Posible values: true, false
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
