Quintiq file version 2.0
#root
#parent: LibOpt_BTDesktop
OrphanComponent FormKPIChart
{
  #keys: '[145136.0.30057991]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 393 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => List752
        Position { startcolumn: 393 startrow: 647 endcolumn: 393 endrow: 647 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 647 parent: 0 }
    ]
  }
  Children:
  [
    #child: List752
  ]
  Properties:
  [
    Height: 292
    IncludeInView: true
    Title: 'KPI Chart'
    Width: 593
  ]
}
