Quintiq file version 2.0
#root
#parent: KpiTrackerDesktop
OrphanComponent Kpi_frmKpiMatrix
{
  #keys: '[136398.1.951693270]'
  Accessibility: 'Extensible'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 446 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => pnlButtons
        Position { startcolumn: 446 startrow: 299 endcolumn: 446 endrow: 299 }
      }
      GBElement
      {
        Component => splwMatrix
        Position { startcolumn: 446 startrow: 564 endcolumn: 446 endrow: 564 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 299 parent: 0 }
      GBFlow.Row { grow: 128 id: 564 parent: 0 }
    ]
  }
  Children:
  [
    #child: pnlButtons
    #child: splwMatrix
  ]
  Properties:
  [
    Height: 825
    Image: 'SCALES'
    IncludeInView: true
    Title: 'KPI matrix comparison'
    Width: 958
    ModeledStringList ChildOrdering
    {
      c: pnlButtons
      c: splwMatrix
    }
  ]
}
