Quintiq file version 2.0
Component PanelInterfaceDataDisplayContent
{
  #keys: '[414502.0.409352883]'
  BaseType: 'WebPanel'
  Children:
  [
    #child: PanelCustomOrder
    #child: PanelForecast
    #child: PanelUnitOfMeasure_MP
  ]
  Properties:
  [
    Orientation: 'collapsible'
    Taborder: 1
  ]
}
