Quintiq file version 2.0
#parent: GroupPanelSecondaryCapacity/CheckBoxSecondaryCapacity
Response OnCreated () id:Response_GroupPanelSecondaryCapacity_CheckBoxSecondaryCapacity_OnCreated
{
  #keys: '[124504.0.324903262]'
  Body:
  [*
    // Enable disable the panel secondary capacity based on current check
    Dialog.EnableDisableGroupPanelSecondaryPanel();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
