Quintiq file version 2.0
#parent: gpResult/lblStart
Response OnUpdateUI () id:Response_gpResult_lblStart_OnUpdateUI
{
  #keys: '[131094.1.161848170]'
  Body:
  [*
    // Use UpdateUI, databinding is too late for using OnChanged- and OnInputIdle-responses.
    // edtWindow.Text() and edtHistory.Text() is set too late when the dialog is opened, which results in a wrong End.
    LibCal_dpCalendarSettings.UpdateStartAndEnd();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnUpdateUI'
}
