Quintiq file version 2.0
#parent: ListStockingPoint_MP
Response OnDrop (
  structured[StockingPoint_MP] information,
  StockingPoint_MP target
) id:Response_ListStockingPoint_MP_OnDrop
{
  #keys: '[108486.2.710004218]'
  Body:
  [*
    // Drag and drop stocking points to change the display sequence
    StockingPoint_MP::Move( target, information );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnDrop'
  UserRequiresReadWrite: true
}
