Quintiq file version 2.0
#parent: GroupPanel404/CheckBoxHasStandardDeviationLeadTimeLaneLeg
Response OnChange () id:Response_GroupPanel404_CheckBoxHasStandardDeviationLeadTimeLaneLeg_OnChange
{
  #keys: '[113398.0.151804966]'
  Body:
  [*
    // Enable / disable components
    
    Dialog.EnableDisableComponent( CheckBoxBatchEditStandardDeviationLeadTime.Visible() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnChange'
}
