Quintiq file version 2.0
#parent: #root
Method EnableDisableEditorMaxQuantity () id:Method_DialogCreateEditSupplySpecification_EnableDisableEditorMaxQuantity
{
  #keys: '[124808.0.125349949]'
  Body:
  [*
    // Enable/disable Editor MaxQuantity
    
    /*
      There's a (corner) case when a supply specification is set intentionally to have a start and end
      at DateTime::MinDateTime() and DateTime::MaxDateTime(), clicking CheckboxHasMaxQuantity
      will reset the start and end to start and end of planning horizon. This is undesirable.
    */
    
    EditorMaxQuantity.Enabled( CheckBoxHasMaxQuantity.Checked() );
  *]
}
