Quintiq file version 2.0
#parent: DataHolderSelectCapacityAllocationResultsRuleConfiguration
Response OnDataChanged () id:Response_FormCapacityAllocationResultsRuleConfiguration_DataHolderSelectCapacityAllocationResultsRuleConfiguration_OnDataChanged
{
  #keys: '[414702.0.391379706]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebComponent_OnDataChanged'
  QuillAction
  {
    Body:
    [*
      traverse ( this.Data(), Elements, e ) {
        info( "面板物料ID：", e.PanelMaterialCode() );
      }
    *]
    GroupServerCalls: false
  }
}
