Quintiq file version 2.0
#root
#parent: KpiTrackerDesktop
OrphanComponent Kpi_frmKpiMasterData
{
  #keys: '[136398.1.474821261]'
  Accessibility: 'Extensible'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 728 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => SplitterWndMetaData
        Position { startcolumn: 728 startrow: 991 endcolumn: 728 endrow: 991 }
      }
      GBElement
      {
        Component => Panel346
        Position { startcolumn: 728 startrow: 130 endcolumn: 728 endrow: 130 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 130 parent: 0 }
      GBFlow.Row { grow: 128 id: 991 parent: 0 }
    ]
  }
  Children:
  [
    #child: SplitterWndMetaData
    #child: Panel346
  ]
  Properties:
  [
    Height: 361
    Image: 'STAIRS_UP'
    IncludeInView: true
    Title: 'KPI master data'
    Width: 527
    ModeledStringList ChildOrdering
    {
      c: Panel346
      c: SplitterWndMetaData
    }
  ]
}
