Quintiq file version 2.0
#parent: #root
Method IsWorkFlowDashboardVisible () as Boolean id:Method_SWF_CustomDrawComponentProcessDashboard_IsWorkFlowDashboardVisible
{
  #keys: '[107588.2015.1162085171]'
  Body:
  [*
    // Indicates if the S&OP toolbar is currently visible
    return [Number] this.GetWorkflowDashboardToolbar().GetProperty( 'Size' ) > 0
  *]
}
