Quintiq file version 2.0
Component SWF_ToolbarPanelProcessDashboard
{
  #keys: '[113694.2.1107289069]'
  BaseType: 'Toolbar'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 241 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => /SWF_CustomDrawComponentProcessDashboard
        Position { startcolumn: 241 startrow: 116 endcolumn: 241 endrow: 116 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 116 parent: 0 }
    ]
  }
  Children:
  [
    #child: SWF_CustomDrawComponentProcessDashboard
  ]
  Properties:
  [
    Border: false
    Size: 151
    Sizeable: true
  ]
}
